0.5 1 1.5 2 2.5 3 x 10^8 0

200

400

Model size

Computation time (min)

0.5 1 1.5 2 2.5 3 x 10_8 0.6

0.8

1

Ratio of computation times

Multi Sources

Single Source

Ratio