0.2 0.4 0.6 0.8 1 Data pass

0.75 0.8 0.85 0.9 0.95 1 1.05

Relative model error

SPLS-RTM w/ true source SPLS-RTM-SE SPLS-RTM-SE w/ 50% noise SPLS-RTM-SE w/ 200% noise